Center at x 0.0000E+00 y 0.0000E+00

CONT: MAP2 01-02RR.V DEV.1

PLot file version 1 created 23-SEP-2003 16:41:04

Cont peak flux = -3.6638E-02 Metre Levs = 3.664E-03 * (-1, -0.700, -0.500, -0.300, -0.200, 0.200, 0.300, 0.500, 0.700, 1) y x -150 -100 -50 0 50 100 150

100

50

0

-50

-100